All Descendants of Queen of England Victoria Hanover (1819 - 1901) through Queen of England Elizabeth_II Alexandra Mary Windsor (1926 - )

Queen of England Victoria Hanover b. 24 MAY 1819 d. 22 JAN 1901

m. 10 FEB 1840 Prince Albert Augustus Charles

b. 26 AUG 1819 d. 14 DEC 1861

King of England Edward_VII Wettin b. 9 NOV 1841 d. 6 MAY 1910

m. 10 MAR 1863 Princess Alexandra of_Denmark ‘Alix’ b. 1 DEC 1844 d. 20 NOV 1925

King of England George_V Windsor b. 3 JUN 1865 d. 20 JAN 1936

m. 6 JUL 1893 Queen Mary_of_Teck (May) b. 26 MAY 1867 d. 24 MAR 1953

King of England George_VI Windsor b. 14 DEC 1895 d. 6 FEB 1952

m. 26 APR 1923 Lady Elizabeth Angela Marguerite Bowes-Lyon b. 4 AUG 1900

Queen of England Elizabeth_II Alexandra Mary Windsor b. 21 APR 1926 m. 20 NOV 1947

Prince Charles Philip Arthur Windsor b. 14 NOV 1948

m. 29 JUL 1981 Lady Diana Frances Spencer b. 1 JUL 1961

Prince William Arthur Philip Windsor b. 21 JUN 1982

Prince Henry Charles Albert Windsor b. 15 SEP 1984 Princess Anne Elizabeth Alice Windsor b. 15 AUG 1950

m. 14 NOV 1973 Captain Mark Anthony Peter Phillips b. 22 SEP 1948

Peter Mark Andrew Phillips b. 15 NOV 1977

Zara Anne Elizabeth Phillips b. 15 MAY 1981

Duke of York Andrew Albert Christian Windsor b. 19 FEB 1960

m. 23 JUL 1986 Duchess of York Sarah Margaret Ferguson b. 15 OCT 1959

Princess Beatrice Elizabeth Mary Windsor b. 8 AUG 1988

Princess Eugenie Victoria Helena Windsor b. 23 MAR 1990

Prince Edward Anthony Richard Windsor b. 10 MAR 1964

victoria.ps 9.68535 / 10.6539; Wed Apr 2 20:12:31 1997 ; 144 folded